// ** The above line should force tbl to be a preprocessor **
// Man page for clocktest
//
// Copyright (C) 2008 Roland Stigge <stigge@antcom.de>
//
// You may distribute under the terms of the GNU General Public
// License as specified in the file COPYING that comes with the
// Xenomai distribution.
//
//
CLOCKTEST(1)
============
:doctype: manpage
:revdate: 2008/04/01
:man source: Xenomai
:man version: {xenover}
:man manual: Xenomai Manual

NAME
----
clocktest - Xenomai Clock Test

SYNOPSIS
--------
*clocktest* ['OPTIONS']

DESCRIPTION
-----------
*clocktest* is part of the Xenomai test suite and tests the Clock. For each
CPU, it repeatedly prints a time offset (compared to the reference
gettimeofday()), a drift value, the number of warps and the maximum warp in
microseconds.

For this program to work, you need to run a suitable Xenomai enabled kernel
with the respective module (xeno_posix).

OPTIONS
-------
*-C <clock_id>*::
	clock to be tested, default=0 (CLOCK_REALTIME=0, CLOCK_MONOTONIC=1, 
CLOCK_HOST_REALTIME=42)

*-T <test_duration_seconds>*::
	default=0 (Never stop, ^C to end)

*-D*::
	print extra diagnostics for CLOCK_HOST_REALTIME

AUTHOR
------
*clocktest* was written by Jan Kiszka. This man page
was written by Roland Stigge.

